              ┌─────────────────────┐
              │     RAMPAGE-PC      │
              └─────────────────────┘
RAMPAGE is a dynamic memory monitor for the Tandy 1000
and most PC/AT & PS2 compatible personal computers. It
allows  you to page through your computer's memory  in
1K blocks. Use it watch programs in action and observe
the inner workings of your computer.                  
                                                      
RAMPAGE lets you move through RAM with the <PG UP> and
<PG DN> keys. Alternatively,  you can jump directly to
a particular location by pressing <P> and entering the
Page  number (0-1023) that you want to inspect.  Press
<U> and the display will be continuously updated.  The
<SPACEBAR> will cancel this last action.  To return to
DOS from RAMPAGE, press <Q>.
