
  For now, GUN requires a VGA monitor and card, 640
  x 480 and at least DOS 3.3. The underpinning of
  any good picture application is the viewer. GUN
  uses GDS, and it is supplied in zipped form. While
  it is being distributed as a shareware version, I
  would encourage you to register the product.  The
  package is being distributed with the express
  consent of Phase II Electronics and Bob Holland.
  My only restriction is that the viewer is
  distributed in unaltered form, thus the actual
  included file is GDS111.zip. You will have to use
  PKunzip to unpack. This can be found on Disk 1. 

    This product currently has about 50 GIF images. 
  There is no limitation on the numbers of pictures
  that can be stored or manipulated. An Unregistered
  GDS will only catalog 500 pictures to the current
  screen and only support up to 640x480 resolution.
  The registered version can handle 1024 x 768. Read
  the GDS documentation for further details about
  the viewer.

    The product is a command bar program: simply
  select the desired function and press <Enter>.
  To escape any command, simply hit escape. 
