NAME	     SysMon

DESCRIPTION  'System Monitor 1.0'

EXETYPE      WINDOWS

STUB	     'WINSTUB.EXE'

CODE	     PRELOAD MOVEABLE
DATA	     PRELOAD MOVEABLE MULTIPLE

HEAPSIZE     32768
STACKSIZE    8192

EXPORTS
  FrameWndProc
  AboutDlgProc
  TimerProc

