NAME	     SBTest

DESCRIPTION  'Status Bar Control Test Application'

EXETYPE      WINDOWS

STUB	     'WINSTUB.EXE'
			  
CODE  PRELOAD MOVEABLE DISCARDABLE

DATA  PRELOAD MOVEABLE MULTIPLE

HEAPSIZE     1024
STACKSIZE    5120	 


EXPORTS
	MainWndProc   @1 
