
     ==[ Set Last On Date ]================================================

     This command allows you to set the date that TQM thinks was the last
     time you were on the system.  This date is used in determining whether
     the system news file and various bulletins are new to you.

     The "last on date" isn't saved when you save your TQM configuration,
     and is extracted from the main BBS every time you enter the TQM door.

     See Also: {C5News Toggle{C0
               {C5New Bulletins Toggle{C0

