'                   Change Colors                  '
'                                                  '
' This option will allow  you to change the colors '
' of all  fields  in the menu.  If at any time you '
' wish to return to the original colors@ enter a 9 '
' in  the  field to reset.  Upon pressing F10@ the '
' colors will be reset. You MUST press the F10 key '
' to  accepts any  changes.  To  exit  without any '
' changes@ press the ESC key.                      '
'                                                  '
'              Change Background Design            '
'                                                  '
' This option  will allow you to  change the ASCII '
' character code used for  the design of the back- '
' ground on the main screen. Any valid code can be '
' used.  Be very  careful  as  to which  code  you '
' select   to   use   because   some   can   cause '
' unpredictable  results.  Enter 999  to reset. To '
' exit without any changes@ press the ESC key. For '
' a list of valid codes@ consult the DOS manual.   '
'                 Change Menu Title                '
'                                                  '
' By selecting this option you can change the main '
' title   on the   menu screen.   The title  is 70 '
' characters long and can contain any valid alpha- '
' numeric  or special  characters. To exit without '
' any changes@ press the ESC key.                  '
'                                                  '
'                                                  '
'                                                  '
'       Change the Screen-Save Timeout Period      '
'                                                  '
' This option allows you to control  the amount of '
' time that  must elapse  without any activity  on '
' THE main menu before the screen is cleared. This '
' field  is entered in  seconds  with the  maximum '
' value  being  9999. If a  value  less  than 1 is '
' entered@ it will  be changed to 0900 seconds. To '
' exit without any changes@ press the ESC key.     '
'                                                  '
'           Change the Mouse Cursor Shape          '
'                                                  '
' This option  will allow you to  change the ASCII '
' character code  used for the design of the Mouse '
' cursor. Any valid code can be used. Be very care-'
' ful as to which  code you select to  use because '
' some can cause unpredictable results.  Enter 999 '
' to reset. To exit without any changes@ press the '
' ESC key. For a list of valid codes@ consult the  '
' DOS manual.                                      '
'             Enter A Time Out Program             '
'                                                  '
' This option allows you to enter up to 2 lines of '
' DOS  or Batch File  commands to execute when the '
' time out period has been reached.  You may stack '
' commands  by  using the  "~" symbol.  If a Batch '
' file will be executed@ it is very important that '
' you put the .BAT extension on the filename.      '
'                                                  '
'                                                  '

