LIBRARY generic

DESCRIPTION  	'Generic Command for use with Windows Commander'
EXETYPE      	WINDOWS	   
STUB	     	'WINSTUB.EXE' 

CODE MOVEABLE
DATA            PRELOAD FIXED SINGLE
HEAPSIZE        14024

EXPORTS
   LibMain                      @1
   WEP                          @2
   ModuleProc                   @3
   ShowOptions                  @4
   ShowAbout                    @5
   OptionsDlg                   @6
   AboutDlg                     @7

IMPORTS
   wstdio.DisplayLine           
   wstdio.GetDisplayWindowHandle
   wstdio.IsDirectory      
   wstdio.lstrstr          
   wstdio.lstrncmp         

