H:\RBBS\MASTER.DIR              ;location and name of master fms directory
TMP                             ;default catagory code for new files
43                              ;single line description length
<description not available>     ;default description bounded by "<>"
5                               ;maximum number of extended description lines
H:\RBBS\MASTER.DBF              ;name of output .DBF to create
11                              ;number of fields in .DBF followed by fldname,fldtyp,fldlen
FILENAME,C,12
SIZE,N,9
DATE,D,8
DESCR,C,43
CAT,C,3
EXTDES1,C,74
EXTDES2,C,74
EXTDES3,C,74
EXTDES4,C,74
EXTDES5,C,74
TAPE,L,1
29                              ;number of directories to read followed by each directory
D:\GOOD\
E:\A\,E:\B\,E:\C\,E:\D\,E:\E\,E:\F\,E:\G\
F:\H\,F:\I\,F:\J\,F:\K\,F:\L\,F:\M\,F:\N\,F:\O\,F:\P\
G:\P\,G:\Q\,G:\R\,G:\S\,G:\T\,G:\U\,G:\V\
H:\W\,H:\X\,H:\Y\,H:\Z\,H:\OTHR\

