ID code not found in record 1 of master file!

The master file which you are attempting to use has been corrupted.

When the program is called an ID parameter is used.  If no ID is
specified the program will not find the master file and will ask
for an ID code on the screen so that an entire new set of files
can be generated.  This ID code is part of all the file names and
is also embedded in a control record in the master file.

Although in this case a proper master file was located by the program
the control record does not agree with the file name.

Solutions:  # Erase this file and start all over again.
            # Exit the program and attempt to fix this file.










