The following maintenance capabilities presently exist:

  Add a new item.

  Update an item.
   The member to be updated may be located by entering the day
       it applies to.  The program will start with the first entry
       for the day in question and you can scan the entries by merely
       hitting the enter key if the entry is not the one you want.
       When you find the correct entry (note that you can scan the
       entire file in this mode, either forward or backward), reply
       Y and the modification menu will be brought up.

  Walk the file.
   Strictly a trouble-shooting aid.
   Included only for the adventuresome.

F2 or the ESC key will send the program back to the main menu.







