Entry of page number for re-start:

Acceptable numbers range from 0 to 999.
(If you have more than that to do, you don't have the time!).

One tricky item here...
    If you want to know how many pages actually will print,
    enter 999 as a page number under the re-start option.
    The program will not start to print, but will count
    page numbers as it goes and report the number of pages
    when it is finished.














