                 FIU/MAG COUNT I

   This data file, in most cases, should only be developed
once per site license.   In some large organizations, it is
possible that the headquarters group has already developed
this file, for standardization throughout the organization.
All that you need to do then is copy that file from a floppy
disk supplied by them to C:\ALPS.   In either case, room for
special containers should be provided at the end of the file.
This procedure will allow you to properly handle the unique
containers, that appear from project to project.   The
entries called for are: NUMBER of CONTAINERS + space
for unique containers in your file,CONTAINER NAME (or
acronym-8 alphas), CONTAINER CAPACITY (you must identify the
container with the highest capacity first, as it sets the
standard against which all the other containers are
measured).   The procedure is menu driven and pulls you
through.   Remember to give full container values only, and
when you have entered your list, carriage return through to
the end.

