                    GENERAL INFORMATION

   This program is designed to ease the paper work burden
encountered in performing this study.   The last two
characters in file names are for internal program use,
therefore, your project names are limited to 6 characters.
If you desire sub directories for projects, you can gang copy
into them using <project name>+??.dta.   Don't forget to use
the sub directory in your path.
   The general flow of information runs from flow of
materials, to other than flow, to combined flow and other
than flow, considering affinities between operation pairs
within your organization.   An optimized layout of either
furniture & equipment or facilities on site can be
accomplished, while setting aside some of the traditional
roadblocks such as inter-departmental jealousies, office
politics, etc..  You should be able to consider more
alternatives, now, than you have been able to in the past.

