                OTHER THAN FLOW IV

operation, you will weight the value of other than flow
ratings when they are combined with flow ratings.   A rule of
thumb to use is listed below:
     PQ AREA             ENTER OTF RATIO     OTF VALUE
     -------             ---------------     ---------
PRODUCTION LINE                    5         1/5
MOD. PROD. LINE                    4         1/4
LINED PROCESS DEPT.                3         1/3
GROUP PRODUCTION                   2         1/2
JOB SHOP                           1          1

   This should be enough spread.   If not, by now you should
have a feel for the PQ concept and be able to steer your own
course.
   See the table at end of the Flow of Materials Help Screen
for affinity ratings.

