   If you desire a feeling for where this program fits into
the general scheme of things please read ALP_INTR.TXT.   It
was included on the ALPS Software Disks.
   This program can be used to automate methods time
measurement forms preparation.   The warning from the MTM
Association for Standards and Research is included here for
your benefit: " Do not attempt to use this chart or apply
Methods-Time Measurement in any way unless you understand the
proper application of the data.   This statement is included
as a word of caution to prevent difficulties resulting from
misapplication of the data."   Since this program has been
written for the trained MTM analyst, it is assumed that the
analyst has access to the chart mentioned (Methods-Time
Measurement Application Data In TMU), and that chart is not
included.   The analyst still has to circle nonlimiting
simultaneous motions and cross out nonlimiting combined
motions manually.   This can be done during review.
   * From ANSI Z-94 "Industrial Engineering Terminology"

