   If you desire a feeling for where this program fits into
the general scheme of things please read ALP_INTR.TXT.   It
was included on the ALPS Software Disks.
   This program can be used to develop Operation Process
Charts.   The definition of an Operation Process Chart is:
*" a graphic, symbolic representation of the act of producing
a product or providing a service, showing operations and
inspections performed or to be performed with their
sequential relationships and materials used.   Operation and
inspection time required and location may be included."
   This program can not only be applied to work measurement
studies, but also to any study, where a picture of a work
process is required to aid a speedy understanding of that
process.   An example would be where this program or the Flow
Process Chart program were used in a facility management
study.   To view sample files select DEMO as the project.
   * From ANSI Z-94 "Industrial Engineering Terminology"

