   If you desire a feeling for where this program fits into
the general scheme of things please read ALP_INTR.TXT.   It
was included on the ALPS Software Disks.
   This program can be used to develop Operator Process
Charts.   The definition of an Operator Process Chart is:
*" an operation process chart describing the work done by one
operator.  (See Right- and Left-Hand Chart).   Synonym:
Operation Time Chart."   Right- and left-hand chart is
defined as:*" a chart on which the motions made by one hand
in relation to those made by the other hand are recorded,
using standard process chart symbols or basic therblig
abbreviations or symbols."
   This chart is often used as an operator instruction sheet
in many factories.   Therblig symbols are not used in this
program but are in the Simo Charts program.
   To view sample files select DEMO as project.
   * From ANSI Z-94 "Industrial Engineer Terminology"

