NotDeclared Reject

Archiver ZIP           
  Add
     0;ignore  No error.
     1;reject  Bad file name or file specification.
     2;reject  Error in ZIP file.
     3;reject  Error in ZIP file.
     4;reject  Insufficient Memory.
     5;reject  Insufficient Memory.
     6;reject  Insufficient Memory.
     7;reject  Insufficient Memory.
     8;reject  Insufficient Memory.
     9;reject  Insufficient Memory.
    10;reject  Insufficient Memory.
    11;reject  Insufficient Memory.
    12;r  No files were found to add to the ZIP file.
    13;r  File not found.  The specified ZIP file or list file was not found.
    14;i  Disk full.
    15;r  ZIP file is read-only and can not be modified.
    16;r  Bad or illegal parameters specified.
    17;r  Too many files.
  Extract
     0;i  No error.
     1;r  Warning error (such as failed CRC check).
     2;r  Error in ZIP file.
     3;r  Error in ZIP file.
     4;i  Insufficient Memory.
     5;i  Insufficient Memory.
     6;i  Insufficient Memory.
     7;i  Insufficient Memory.
     8;i  Insufficient Memory.
     9;i  File not found.  No ZIP files found.
    10;i  Bad or illegal parameters specified.
    11;r  No files found to extract/view etc.
    50;i  Disk Full.
    51;r  Unexpected EOF in ZIP file.
End Archiver

Archiver ARJ
  All
     0;i  success.
     1;i  warning Specified file to add to archive not found.
     2;r  fatal error.
     3;r  CRC error (header or file CRC error).
     4;i  ARJ-SECURITY error or attempt to update an ARJ-SECURED archive.
     5;i  disk full or write error.
     6;i  can't open archive or file.
     7;i  simple user error (bad parameters).
     8;i  not enough memory.
End Archiver
 
Archiver LHA
  All
     0;i  Normal.
     1;r  CRC error occured -or- Disk full.
     2;r  Fatal error.  Process terminated without transactions.
     3;r  Failed to write temporary files in the archive.  
End Archiver

Archiver ARC 
  All
     1;r  bad CRC.
     2;i  out of memory.
     3;i  no archives found to extract.
     4;r  can't open archive file.
     5;r  read error on archive.
     6;r  internal table overflow.
     7;i  disk full.
End Arciver

Archiver PAK
  All
     0;i  No Error.
     1;r  CRC error or file missing.      
     2;r  Out of memory.
     7;r  Disk error.
End Archiver
