Novell Help Librarian Data File Version 1.00
COPYRIGHT (c) 1985 by Novell, Inc.  All Rights Reserved.
#·D<╓Γ╓tS	▄M≡5┴7*:Z=)AâA▄AvB╠D─F8GÿH┼I<JM R╦SVÆ\R^ahjCqt|u¿v^xz∩{v}0ä$îÄ	
*( Abandon PRINTDEF Help           1 of 1
════════════════════════════════════════  PRINTDEF's printer definitions or form
 definitions have been changed. You
 will be given the chance to verify
 your decision to exit PRINTDEF. If you
 do exit PRINTDEF, all changes are
 lost.
<:é Absolute Exit Options                        Help 1 of 1
══════════════════════════════════════════════════════════  PRINTDEF's printer definitions or form definitions have
 been changed and you are going to exit PRINTDEF. This is
 your last chance to save your modified database.

 You have the following options:

 Save database, then EXIT       The current database is                                   written to disk before                                    exiting PRINTDEF.

 EXIT without saving database   Any changes to the 
                                database are lost before
                                exiting PRINTDEF.?=⌠ Available Printer Definitions                   Help 1 of 1
═════════════════════════════════════════════════════════════  This is a list of files that contain printer definition
 information and the names of the printers they define. The
 files are from the specified directory. Only files that
 have the extension .PDF are included in the list.
 
 The following keys are active:

  <Escape>   Terminate import process and return to Print                 Device Options menu.

  Mark (F5)  Mark the currently highlighted file; or, if the              file is already marked, unmark it.

  <Enter>    Insert the selected printer name and definition              into the Defined Print Devices list; or, insert              all the marked definition files.⌠
MK· Display Functions Escape Sequence                             Help 1 of 2
═══════════════════════════════════════════════════════════════════════════  This window displays the selected function's escape sequence.

 If a character in the escape sequence has an ASCII value less than 33, or
 equal to 127, it is displayed as a delimited acronym. If its ASCII value
 is greater than 127, it is displayed as a delimited ASCII value. The
 value is a decimal number.

 The angle brackets (< and >) are used as delimiters. If the function's
 escape sequence contains a single left angle bracket (<), it will be
 displayed as a double left angle bracket (<<).

 The following help screen shows the relationship between the ASCII values
 and the delimited ASCII acronym.ΓNL╩ Display Function                                              Help 2 of 2
════════════════════════════════════════════════════════════════════════════  ASCII Delim Ctrl   ASCII Delim Ctrl   ASCII Delim Ctrl   ASCII Delim Ctrl
 Value  Acr. Char   Value  Acr. Char   Value  Acr. Char   Value  Acr. Char
 ----- ----- ----   ----- ----- ----   ----- ----- ----   ----- ----- ----      0  <NUL>          10  <LF>   ^J      20  <DC4>  ^T      30  <RS>
    1  <SOH>  ^A      11  <VT>   ^K      21  <NAK>  ^U      31  <US>
    2  <STX>  ^B      12  <FF>   ^L      22  <SYN>  ^V      32  <SP>
    3  <ETX>  ^C      13  <CR>   ^M      23  <ETB>  ^W     127  <DEL>
    4  <EOT>  ^D      14  <SO>   ^N      24  <CAN>  ^X
    5  <ENQ>  ^E      15  <SI>   ^O      25  <EM>   ^Y
    6  <ACK>  ^F      16  <DLE>  ^P      26  <SUB>  ^Z
    7  <BEL>  ^G      17  <DC1>  ^Q      27  <ESC>
    8  <BS>   ^H      18  <DC2>  ^R      28  <FS>
    9  <HT>   ^I      19  <DC3>  ^S      29  <GS>75å Duplicate .PDF Filename                 Help 1 of 1
═════════════════════════════════════════════════════  The name you have chosen for your exported .PDF
 file matches a .PDF file in the destination
 directory.

 If you select Yes, your exported .PDF file will
 overwrite the existing .PDF file in the destination
 directory.

 If you select No you can change the name of your
 .PDF file.
53╟ Edit Device Name                      Help 1 of 1
═══════════════════════════════════════════════════  A printer device name must be

     - unique (no two names can be the same).
     - no longer than 32 characters.
     - case sensitive (for display purposes).
     - case insensitive (for comparison purposes).

 The printer device name should be a meaningful
 name that is understood by network users, such as
 the brand name or model of the printer.
53┤ Edit Mode Name                        Help 1 of 1
═══════════════════════════════════════════════════  A mode name must be

     - unique (no two names can be the same).
     - no longer than 32 characters.
     - case sensitive (for display purposes).
     - case insensitive (for comparison purposes).
 
 The mode name should be a meaningful name, so
 that network users can associate the mode name to
 a particular printing process.86╥ Edit PDF. Filename                       Help 1 of 1
══════════════════════════════════════════════════════  A .PDF filename must

     - be no longer than eight characters.
     - have no extension (no period in the name).
     - be case insensitive.
     - be composed of valid filename characters.

 It is helpful if the .PDF filename reflects the name
 of the print device that is being exported.

 PRINTDEF automatically adds a .PDF extension to the
 filename.CA╗ Destination Directory                               Help 1 of 1
═════════════════════════════════════════════════════════════════  When exporting you can specify the server, volume, and
 directory path that describes where the .PDF is to be written.
 If you want to change the directory path, volume, or server,
 use <Insert>. Use <Escape> and <Enter> to set the desired
 export path.  

 You need Create, Write, and Search rights in the directory you
 want to export to.

 The active keys are:

 <Escape>  Abandon export, return to Print Device Options menu.
 <Insert>  Change the directory, volume, or server.
 <Enter>   Export the .PDF file to the currently displayed path             location.

<:Y Function Definition                          Help 1 of 1
══════════════════════════════════════════════════════════  You are looking at the Function Definition form. It
 lets you define a PRINTDEF function.

 To define a PRINTDEF function, fill in the function name
 and escape sequence. Press <Escape> to exit the menu.

 The active editing keys are:

   <Escape>       Back up to previous level.
   Arrow keys     Move field cursor to the other field.
   <Enter>        Select current field for editing.

 For help on a particular field of this form, select that
 field and press the Help key (F1).ÑPN@ Function Help: Introduction                                      Help 1 of 7
══════════════════════════════════════════════════════════════════════════════  Most printers can be software controlled by interpreting a particular
 sequence of characters as control characters. An escape sequence is an
 example of a sequence of control characters. 

 PRINTDEF lets the network supervisor define PRINTDEF functions. These
 functions are similar to escape sequences, except that any ASCII character
 can be used in any part of the sequence. 

 PRINTDEF regards characters that have an ASCII value of less than decimal 33
 or greater than decimal 126 as special characters, and they must be entered
 using a delimited token. 

 The space character can be entered as is or as a delimited token. A space is
 displayed as a delimited token. Except for delimited tokens, characters in
 a function follow the "used as is" rule. This means that the characters
 you see displayed are the actual characters that make up the function.

 The help screens that follow explain the use of delimited tokens.#MPN_ Function Help: Delimited Tokens                                  Help 2 of 7
══════════════════════════════════════════════════════════════════════════════  PRINTDEF functions can contain special characters when delimited tokens are
 included in the function. A delimited token has two parts--the delimiters
 and the token.  The three types of delimiters are

        Angle brackets   < and >
        Backwards slash   \
        Caret            ^ 

 Since these characters function as delimiters, they are exceptions to the
 "used as is" rule. 

 To enter a left angle bracket (<), backwards slash (\), or caret (^), you
 must enter two characters.

 The right angle bracket (>) can be used as is. For example, a function that
 contains the string \\<<^^> will be interpreted as \<^>.  The "double" rule
 is used when entering and displaying PRINTDEF functions.'ÑPNτ Function Help: Delimited Tokens                                  Help 3 of 7
══════════════════════════════════════════════════════════════════════════════  The other part to a delimited token is the token. A token can be a number,
 character, or a valid character string.

 Numbers are used in conjunction with the angle bracket or backwards slash
 delimiters and can be entered in decimal or hexadecimal. To enter a
 hexadecimal number, use a 0x or 0X prefix. A number without the hexadecimal
 prefix is assumed to be decimal. 

 For example, the ASCII escape character can be input by the delimited
 numbers <27>, <0x1b>, <0X1B>, \27, \0x1b, or \0X1B. You can enter any ASCII
 character value from 0 to 255 using this method.

 Character tokens can be used with angle bracket or caret delimiters. Valid
 characters are A through Z and a through z. Delimited character tokens are
 the same as ASCII control characters. In other words, ^A has an ASCII value
 of 1, ^B has an ASCII value of 2, etc.₧*#PNk Function Help: Delimited Tokens                                  Help 4 of 7
══════════════════════════════════════════════════════════════════════════════  Character string tokens are the names or acronyms of ASCII control
 characters. The name is case insensitive. 

 For example, the ASCII escape character can be input by the delimited
 strings <esc>, <ESC>, or <Escape>.   

 The syntax for a delimited token is

     delimited_token     = delimited_number, delimited_character, or       
                           delimited_string.
     delimited_number    = <number_token> or \number_token.
     delimited_character = ^character_token or <^character_token>.
     delimited_string    = <string_token>.
     number_token        = 0 - 255 or 0x0 - 0xFF.
     character_token     = A - Z or a - z.
     string_token        = (see pages 5 through 7 of this help context).╕-'PN Function Help: Examples and Valid String Tokens                  Help 5 of 7
══════════════════════════════════════════════════════════════════════════════  The following are examples of three equivalent functions:

  <ESC><SI>^^<DEL><soh> == <0x1B><0xF>\0x5E<0x7F>^A == \27<15><94><127>\1

 ASCII         
 Value   VALID STRING TOKENS
 ----- ----------------------------------------------------------------------
    0    NUL, NULL
    1    SOH, ^A, START OF HEADER, START_OF_HEADER, STARTOFHEADER
    2    STX, ^B, START OF TEXT, START_OF_TEXT, STARTOFTEXT
    3    ETX, ^C, END OF TEXT, END_OF_TEXT, ENDOFTEXT
    4    EOT, ^D, END OF TRANSMISSION, END_OF_TRANSMISSION, ENDOFTRANSMISSION     5    ENQ, ^E, ENQUIRE
    6    ACK, ^F, ACKNOWLEDGE
    7    BEL, ^G, BELLm2₧*PN¥ Function                                                         Help 6 of 7
══════════════════════════════════════════════════════════════════════════════  ASCII         
 Value   VALID STRING TOKENS
 ----- ----------------------------------------------------------------------
    8    BS,  ^H, BACK SPACE, BACK_SPACE, BACKSPACE
    9    TAB, ^I, HT, HORIZONTAL TAB, HORIZONTAL_TAB, HORIZONTALTAB
   10    LF,  ^J, LINE FEED, LINE_FEED, LINEFEED
   11    VT,  ^K, VERTICAL TAB, VERTICAL_TAB, VERTICALTAB
   12    FF,  ^L, FORM FEED, FORM_FEED, FORMFEED
   13    CR,  ^M, RET, CARRIAGE RETURN, CARRIAGE_RETURN, CARRIAGERETURN
   14    SO,  ^N, SHIFT OUT, SHIFT_OUT, SHIFTOUT
   15    SI,  ^O, SHIFT IN, SHIFT_IN, SHIFTIN
   16    DLE, ^P, DATA LINK ESCAPE, DATA_LINK_ESCAPE, DATALINKESCAPE
   17    DC1, ^Q, DEVICE CONTROL 1, DEVICE_CONTROL_1, DEVICECONTROL1
   18    DC2, ^R, DEVICE CONTROL 2, DEVICE_CONTROL_2, DEVICECONTROL2
   19    DC3, ^S, DEVICE CONTROL 3, DEVICE_CONTROL_3, DEVICECONTROL3
   20    DC4, ^T, DEVICE CONTROL 4, DEVICE_CONTROL_4, DEVICECONTROL4
   21    NAK, ^U, NEGATIVE ACKNOWLEDGE, NEGATIVE_ACKNOWLEDGE,             
                  NEGATIVEACKNOWLEDGE
╕-PNk Function                                                         Help 7 of 7
══════════════════════════════════════════════════════════════════════════════  ASCII
 Value   VALID STRING TOKENS
 ----- ----------------------------------------------------------------------
   22    SYN, ^V, SYNCHRONOUS
   23    ETB, ^W, END OF TRANSMISSION BLOCK, END OF TRANS BLOCK,           
                    END_OF_TRANSMISSION_BLOCK, ENDOFTRANSMISSIONBLOCK
   24    CAN, ^X, CANCEL
   25    EM,  ^Y, END OF MEDIUM, END_OF_MEDIUM, ENDOFMEDIUM
   26    SUB, ^Z, SUBSTITUTE
   27    ESC, EC, ESCAPE
   28    FS,  FILE SEPARATOR, FILE_SEPARATOR, FILESEPARATOR
   29    GS,  GROUP SEPARATOR, GROUP_SEPARATOR, GROUPSEPARATOR
   30    RS,  RECORD SEPARATOR, RECORD_SEPARATOR, RECORDSEPARATOR
   31    US,  UNIT SEPARATOR, UNIT_SEPARATOR, UTILSEPARATOR
   32    SP,  SPACE
  127    DEL, DELETE
53╣ Function Name                         Help 1 of 1
═══════════════════════════════════════════════════  A function name must be

     - unique (no two names can be the same).
     - no longer than 32 characters.
     - case sensitive (for display purposes).
     - case insensitive (for comparison purposes).
 
 A function name should be a meaningful name that
 is understood by network users, such as the name
 used in the printer's manual.	=
;Q Export Device Filename                        Help 1 of 1
═══════════════════════════════════════════════════════════  When you export a printer definition to a file, PRINTDEF
 automatically appends a .PDF extension to the filename.
 This is why the exported filename can be no longer than
 eight characters.

 It is helpful if the filename reflects the name of the
 device being exported. For example, a device with a
 defined name of LINE PRINTER might have an export
 filename of LINE_PRN. In the selected directory, PRINTDEF
 would save the printer's name and definition as
 LINE_PRN.PDF.HF Source Directory                                         Help 1 of 1
══════════════════════════════════════════════════════════════════════  When importing, you can specify the server, volume, and path that
 describe where the .PDF can be retrieved. If you want to change the
 directory, volume, or server, use <Insert>. After building the
 desired import path, use <Escape> and <Enter> to verify the path and
 bring up the list of .PDF files in that directory.

 You need Read, Open, and Search rights in the directory you want to
 import to. 

 The active keys are:

     <Escape>   Abandon import, return to Print Device Options menu.
     <Insert>   Change the directory, volume, or server.
     <Enter>    Import the .PDF file from the currently displayed                     directory.KI╖ Print Device Options                                        Help 1 of 1
═════════════════════════════════════════════════════════════════════════  The print device options are:

 EDIT PRINT DEVICE:   Create, delete, or modify printer names and
                      definitions.
 IMPORT PRINT DEVICE: Insert a previously exported printer name and                            definition.
 EXPORT PRINT DEVICE: Save the selected printer name and definition                            to a .PDF file.

 A user who is logged in to server A can send a print job across the
 internet to a printer attached to server B. The PRINTDEF database on
 server A must contain the definition for the printer attached to server
 B. The supervisor for server B can export the printer's definition to a
 .PDF file. Another supervisor can then import the printer definition
 and save the database. Then server B's definition would be defined on
 that supervisor's server.42B To import from the specified directory, you need
 the Read right.20A To export to the specified directory, you need
 the Write right.,*é When importing a device definition (.PDF
 file), PRINTDEF searches the selected
 directory with a *.PDF filename search
 pattern.FD> Other Device Functions                                 Help 1 of 1
════════════════════════════════════════════════════════════════════  This is a list of the printer functions that are not a part of
 the currently selected mode. You can edit the mode's definition by
 appending or inserting one or more of these functions. The order
 of the mode's associated functions is important.
 
 The following keys are active:

 <Escape>   Exit, return to the current mode's list of functions.
 Mark (F5)  Associate the marked functions.
 <Enter>    Associate the selected function.:
8α Form Definition                            Help 1 of 1
════════════════════════════════════════════════════════  You are looking at the Form Definition form.

 The active editing keys are:

   <Escape>       Back up to previous level.
   Up, Left       Move field cursor to next field.
   Down, Right    Move field cursor to previous field.
   <Enter>        Select current field for editing.

 For help on a particular field of this form, select
 that field and press Help (F1).,*\ The form length is the number of lines
 per page. It must be within the range of
 1 to 255.
5	3H Form Name                             Help 1 of 1
═══════════════════════════════════════════════════  A form name must

     - be unique (no two names can be the same).
     - have an alphabetic first letter.
     - not contain spaces (underscores are okay).
     - be no longer than 12 characters.
     - be case insensitive.		97 Form Number                               Help 1 of 1
═══════════════════════════════════════════════════════  The following criteria apply to form numbers:

     - They must be unique (no two numbers can be the         same).
     - They must be within the range of 0 to 255.20_ The form width is the number of characters per
 line. It must be within the range of 1 to 999.DB░ Print Device                                         Help 1 of 1
══════════════════════════════════════════════════════════════════  This is a list of currently defined print devices. You can add,
 delete, and modify print device names and definitions.

 The following keys are active:

   <Escape>    Exit list of devices, return to PRINTDEF Options                  menu.
   Mark (F5)   Toggle marking for the selected device.
   <Modify>    Edit the selected print device name.
   <Insert>    Add a new print device name to the list.
   <Enter>     Edit the selected print device definition.
   <Delete>    Delete the selected print device name and                         definition.PFD√ Exit Options                                           Help 1 of 2
════════════════════════════════════════════════════════════════════  PRINTDEF's printer definitions or form definitions have been
 changed.

 The following options are available:

   Save database, then EXIT      The current database is written to                                  disk before exiting PRINTDEF.

   EXIT without saving database  Any changes to the database are
                                 lost before exiting PRINTDEF.

   Do not EXIT                   Return to PRINTDEF options menu.                                    The changes that were made are                                      NOT lost and the old database is                                    NOT overwritten.MFD± Exit Options                                           Help 2 of 2
════════════════════════════════════════════════════════════════════  If an error occurs during the writing of the database, the
 following suggestions may be helpful:

 Make sure the database pathname is SYS:PUBLIC\NET$PRN.DAT.

 Check that the database file is not open.

 Check that the database is not locked. (It does not need to be
 opened to be locked.)

 Make sure there is enough disk and directory space on volume
 SYS.	>
<ô Export Print Device                            Help 1 of 1
════════════════════════════════════════════════════════════  This is a list of currently defined print devices. The
 selected device definition is written to a .PDF file.  

 The following keys are active:

 <Escape>   Abandon export, return to Print Device Options                 menu.
 <Enter>    Edit the selected print device definition.	=;3 Form List                                     Help 1 of 1
═══════════════════════════════════════════════════════════  You are looking at the list of defined form names with
 their associated form numbers.

 You can add, delete, and edit form names and definitions.

 The following keys are active:

 <Escape>   Exit and return to the PRINTDEF Options menu.
 <Modify>   Edit the selected form name.
 <Insert>   Add a new form name and definition.
 <Enter>    Edit or examine the selected form definition.
 <Delete>   Delete the selected form name and definition.ªYJHx Mode's Associated Functions                                Help 1 of 1
════════════════════════════════════════════════════════════════════════  This is a list of functions associated with the current mode. You can
 edit the mode's definition by appending a function, inserting a
 function, or removing a function from the list. The order of the
 associated functions is important.
 
 The following keys are active:

 <Escape>    Exit this list of functions and return to the list of                   modes.
 Mark (F5)   Toggle marking for selected function. If adding functions,
             they are inserted in front of marked function.
 <Insert>    If a function is marked: insert before marked function.                 If no function is marked: append to end of list. 
 <Enter>     Examine the selected function.
 <Delete>    Remove the selected or marked functions from the list.VNL╘                   MODE'S ASSOCIATED FUNCTIONS HELP

The following keys are active:

     ESCAPE -  Return to the list of modes.  The current list of         
               functions is associated with this mode.

     MARK   -  Toggle marking of the currently selected function.

     INSERT -  Add another function. If a function is marked before using
               the INSERT Key, the new function will be inserted before  
               the marked function.  Otherwise the new function will be  
               appended to the end of the list.

     SELECT -  View the device's other disassociated functions.

     DELETE -  Disassociate the selected or marked functions from          
               this mode.     	=
;¿ Edit Device Options                           Help 1 of 1
═══════════════════════════════════════════════════════════  The Edit Device options are:

 Device modes       Edit the selected device's mode names
                    and mode definitions.
  
 Device Functions   Edit the selected device's function  
                    names and function definitions or add
                    new function names and definitions.QaGEτ Function List                                           Help 1 of 3
═════════════════════════════════════════════════════════════════════  This is a list of currently defined function names and associated
 escape sequences. The escape sequence can contain any ASCII
 character. If the escape sequence takes more than 32 characters to
 display, it is truncated.

 The following keys are active:

 <Escape>   Exit list of functions, return to edit device options.
 Mark (F5)  Toggle marking for the selected function.
 <Modify>   Edit the selected function. 
 <Insert>   Create a new function and its escape sequence.
 <Enter>    Examine the selected function's escape sequence.
 <Delete>   Delete the selected function and its escape sequence.~dR^HF Function List                                            Help 2 of 3
══════════════════════════════════════════════════════════════════════  If a character in the function's escape sequence has an ASCII value
 less than 33 or equal to 127, it is displayed as a delimited ASCII
 acronym. If its ASCII value is greater than 127, it is displayed as
 a delimited ASCII value. The value is displayed as a decimal number.

 The angle brackets (< and >) are used as delimiters. They enclose
 the ASCII acronym or ASCII value. If the function's escape sequence
 contains a single left angle bracket (<), it will be displayed as a
 double left angle bracket (<<) to distinguish it from a delimiter.

 The following help screen shows the delimited ASCII acronyms and
 their associated ASCII values.QaNL╦ Function List                                                  Help 3 of 3
════════════════════════════════════════════════════════════════════════════
 ASCII Delim Ctrl   ASCII Delim Ctrl   ASCII Delim Ctrl   ASCII Delim Ctrl
 Value  Acr. Char   Value  Acr. Char   Value  Acr. Char   Value  Acr. Char
 ----- ----- ----   ----- ----- ----   ----- ----- ----   ----- ----- ---- 
    0  <NUL>          10  <LF>   ^J      20  <DC4>  ^T      30  <RS>
    1  <SOH>  ^A      11  <VT>   ^K      21  <NAK>  ^U      31  <US>
    2  <STX>  ^B      12  <FF>   ^L      22  <SYN>  ^V      32  <SP>
    3  <ETX>  ^C      13  <CR>   ^M      23  <ETB>  ^W     127  <DEL>
    4  <EOT>  ^D      14  <SO>   ^N      24  <CAN>  ^X
    5  <ENQ>  ^E      15  <SI>   ^O      25  <EM>   ^Y
    6  <ACK>  ^F      16  <DLE>  ^P      26  <SUB>  ^Z
    7  <BEL>  ^G      17  <DC1>  ^Q      27  <ESC>
    8  <BS>   ^H      18  <DC2>  ^R      28  <FS>
    9  <HT>   ^I      19  <DC3>  ^S      29  <GS>	=
;ï Import Device                                 Help 1 of 1
═══════════════════════════════════════════════════════════  This is a list of currently defined print devices. The
 selected device definition is written to a .PDF file.

 The following keys are active:

 <Escape>   Abandon export, return to Print Device Options             menu.
 <Enter>    Edit the selected print device definition.2l97 PRINTDEF Options                          Help 1 of 3
═══════════════════════════════════════════════════════  The main PRINTDEF options are:

 PRINT DEVICES: Import, export, and edit printer names
                and definitions.
   
 FORMS: Create, delete, or modify form names and
        definitions.

 The following keys are active:

 <PageDown>   Read the next page of help.
 <PageUp>     Read the previous page of help.
 <Escape>     Exit help.
 Help (F1)    Displays machine's function key                        assignments.╓nj:8î PRINTDEF Overview                          Help 2 of 3
════════════════════════════════════════════════════════  PRINTDEF is a printer definition utility. With
 PRINTDEF, the network supervisor can define modes of
 operation and forms for network printers.

 Network users can examine the printer definitions
 (i.e., modes, functions) and form definitions.

 PRINTDEF creates a database of device and form
 definitions. Only a network supervisor can create or
 delete PRINTDEF's database. PRINTCON, a print job
 configuration utility, and NPRINT access PRINTDEF's
 database and use the device definitions when
 submitting print jobs to a print server.2l:8U PRINTDEF Terms                             Help 3 of 3
════════════════════════════════════════════════════════  FUNCTION: The individual escape sequence or control
 code character string that controls a printing
 characteristic of a printer.

 MODE: An ordered group of functions that configures a
 printer for a particular print job.

 DEVICE: Any printing device used on the network that
 can be defined or controlled by PRINTDEF. In PRINTDEF
 the term "printer" has the same meaning as "device."

 FORM: A form may be single sheets of paper,
 continuous-feed paper, sales orders, labels, etc.DB¬ Mode                                                 Help 1 of 1 ══════════════════════════════════════════════════════════════════  This is a list of modes for the currently selected printer. A
 mode consists of an association with one or more defined printer
 functions.

 You can add, delete, or modify mode names and mode definitions.
 
 The following keys are active:

 <Escape>   Exit this list of modes and return to the list of                 devices.
 Mark (F5)  Toggle marking for the selected mode.
 <Modify>   Edit the selected mode name.
 <Insert>   Add a new mode name to the list.
 <Enter>    Edit or examine the selected mode.
 <Delete>   Delete the selected mode.,*_ Exit                         Help 1 of 1
══════════════════════════════════════════  If you select Yes and changes were made
 to the PRINTDEF database, you will have
 the opportunity to save it at the next
 menu.

 If you select Yes and no changes were
 made, you will exit PRINTDEF.

 If you select No, you will return to the
 PRINTDEF Options menu.4	2 Form Definition                      Help 1 of 1
══════════════════════════════════════════════════  You are looking at the form definition.

 A form definition is composed of a name, number,
 length, and width.

 If you need a form defined, contact your network
 supervisor.	
=;₧ Defined Print Device's                        Help 1 of 1
═══════════════════════════════════════════════════════════  This is a list of the currently defined print devices.
 Your network supervisor can add, delete, and modify print  device names and definitions.

 The following keys are active:

 <Escape>  Exit and return to the PRINTDEF Options menu.
 
 <Enter>   Examine the selected print device definition.
<
:Ñ Form List                                    Help 1 of 1
══════════════════════════════════════════════════════════  You are looking at the list of defined forms and their
 associated form numbers.

 Your network supervisor can add, delete, or modify form
 names and definitions.

 The following keys are active:

 <Escape>  Exit and return to the PRINTDEF Options menu.

 <Enter>   Examine the selected form definition.
<:╝ Mode's Associated Functions                  Help 1 of 1
══════════════════════════════════════════════════════════  This is a list of functions associated with the
 currently selected mode. The network supervisor can add,
 delete, or reorder this mode's associated functions.

 The following keys are active:

 <Escape>   Exit this list of functions and return to                 the list of modes.

 <Enter>    Examine the selected function.	=	;o Edit Device Options                          Help 1 of 1
═══════════════════════════════════════════════════════════  The edit device options are:

 Device Modes       Examine the current device's mode
                    names and mode definitions.
     
 Device Functions   Examine the current device's function                      names and function definitions.MÇEC┐ Function List                                         Help 1 of 2
═══════════════════════════════════════════════════════════════════  The list of device functions shows the function names and the
 associated function. If the function is greater than 32
 characters in length, it is truncated. 

 The angle brackets (< and >) are used as delimiters. They are
 used to enclose an ASCII acronym or an extended ASCII value.
 The values are in decimal. If the function string contains a
 single left angle bracket (<), it will be displayed as a double
 left angle bracket (<<).

 The following keys are active:

   <Escape>   Exit and return to the previous menu.

   <Enter>    View the selected function.v}NL╦ Function List                                                  Help 2 of 2
════════════════════════════════════════════════════════════════════════════
 ASCII Delim Ctrl   ASCII Delim Ctrl   ASCII Delim Ctrl   ASCII Delim Ctrl
 Value  Acr. Char   Value  Acr. Char   Value  Acr. Char   Value  Acr. Char
 ----- ----- ----   ----- ----- ----   ----- ----- ----   ----- ----- ---- 
    0  <NUL>          10  <LF>   ^J      20  <DC4>  ^T      30  <RS>
    1  <SOH>  ^A      11  <VT>   ^K      21  <NAK>  ^U      31  <US>
    2  <STX>  ^B      12  <FF>   ^L      22  <SYN>  ^V      32  <SP>
    3  <ETX>  ^C      13  <CR>   ^M      23  <ETB>  ^W     127  <DEL>
    4  <EOT>  ^D      14  <SO>   ^N      24  <CAN>  ^X
    5  <ENQ>  ^E      15  <SI>   ^O      25  <EM>   ^Y
    6  <ACK>  ^F      16  <DLE>  ^P      26  <SUB>  ^Z
    7  <BEL>  ^G      17  <DC1>  ^Q      27  <ESC>
    8  <BS>   ^H      18  <DC2>  ^R      28  <FS>
    9  <HT>   ^I      19  <DC3>  ^S      29  <GS>PåEC PRINTDEF Options                                      Help 1 of 3
═══════════════════════════════════════════════════════════════════  The main PRINTDEF options are:

     PRINT DEVICES:  Examine printer names and definitions.
     FORMS:          Examine form names and definitions.         
             
 The following keys are active:

     <PageDown> Read the next page of Help.
     <PageUp>   Read the previous page of Help.
     <Escape>   Exit HELP.
     Help (F1)  Displays machine's function key assignments.ë0äFDú PRINTDEF Overview                                      Help 2 of 3
════════════════════════════════════════════════════════════════════  PRINTDEF is a printer definition utility. With PRINTDEF, the
 network supervisor can define modes of operation and forms for
 network printers.

 Network users can examine the printer definitions (i.e., modes,
 functions) and form definitions.

 PRINTDEF creates a database of device and form definitions. Only a
 network supervisor can create or delete PRINTDEF's database.
 PRINTCON, a print job configuration utility, and NPRINT access
 PRINTDEF's database and use the device definitions when submitting
 print jobs to a print server.PåFD PRINTDEF Terms                                         Help 3 of 3
════════════════════════════════════════════════════════════════════  FUNCTION: A function is the individual escape sequence or control
           code character string that controls a printing
           characteristic of a printer.

 MODE:     A mode is an ordered group of functions that configures
           a printer for a particular print job.

 DEVICE:   A PRINTDEF device is any printing device used on the                network that can be defined or controlled by PRINTDEF               functions. In PRINTDEF the term "printer" has the same              meaning as "device."

 FORM:     A form may be single sheets of paper, continuous-feed               paper, sales orders, labels, etc.
;
9▐ Mode                                        Help 1 of 1
═════════════════════════════════════════════════════════  This is a list of modes for the currently selected
 printer. A mode consists of an association with one or
 more defined printer functions. Your network supervisor
 can create modes for a network printer.
 
 The following keys are active:

 <Escape>   Exit this list of modes and return to the
            list of devices.

 <Enter>    Examine the selected mode.
/-╔ Exit                            Help 1 of 1
═════════════════════════════════════════════  If you select Yes, you will exit PRINTDEF.

 If you select No, you will return to the
 PRINTDEF Options menu.