CMCom NOTICE!!

This version of CMCom is not compatible with Online Play. While in
Online Play, the graphics of CMCom will be disabled. CMCom may be
used in normal play.

Once the Graphics have been disabled, in order to utilize the Graphics,
you'll need to reset your Graphics setting from ChessMAGIC!'s main menu
with the '=' option. Otherwise when you log into ChessMAGIC!, it will
only provide ANSI Graphics. This option is set automatically to "NO"
when using CMCom in conjunction with the Online Graphics.

Version CMCom version 4.0 will have the online capabilities included.