                 BitFax Status Log Help

The Status Log is used to keep track of all transmissions you have sent
through BitFax.  It is for your information only, there are no parameters
that need to be changed.

To move around in the log, press the up or down arrow keys.  You may also
press [PgUp] and [PgDn].

To print the log, press [F3].  Press [F7] to delete all entries in the log,
or [F8] to delete only the highlighted entry.  To return to the Main Menu,
press [F10].

For more information about this menu, consult the User's Manual.
