HELP ON MYCLOCK

MYCLOCK displays the current date and time on the screen.

The options available within MYCLOCK are selected by positioning the mouse cursor over the "Menu" selection and clicking the left mouse button.  A list of the available options is shown below.  Click on an item in the list to see more details.

Company Information

Chimes

Test Chimes

Alarm

Never Hidden

Menu

About...


COMPANY INFORMATION

This option displays convenient information for the user.


CHIMES

MYCLOCK can remind you of the time by sounding the computer's internal beeper.  Enable or disable this feature by using the mouse to select "Chimes" from the menu.  At One O'clock the computer will beep once, at Two O'clock it will beep twice, etc.  Note that when this option is enabled a check mark appears next to the "Chimes" option.


TEST CHIMES

This option allows you to check that the chimes are working.  Select this option with the mouse and the chimes will sound for about ten seconds.


ALARM

MYCLOCK has three alarms that you can set to sound the beeper at any time.  Use this feature to remind you of important appointments, meetings, etc.  After you have clicked on the "Alarm" option, MYCLOCK will display a screen that will allow you to set the time when the alarm should sound.  Click on the "Up" and "Down" buttons to increase or decrease the time when the alarm should sound.  To enable the alarm, click on the "Enable Alarm" selector box.   If you would like the alarm to repeat at the same time each day, click on the "Repeat" selector box.  When you have finished entering the alarm time, click on "OK".  If you click on "Cancel", the alarm settings will be returned to the state they were in prior to you selecting the "Alarm" option.  Note that when an alarm is enabled a check mark appears next to the "Alarm" option for that alarm.

When an alarm goes off, the beeper will sound for about two minutes, or until you position the mouse cursor over the clock display and click the left mouse button  twice.


NEVER HIDDEN

Select this option if you want the clock display to always be the topmost display.  This option is selected by positioning the mouse cursor over "Never hidden" and clicking the left mouse button.  Deselect the option in the same way.  A check mark appears next to this option when it is enabled.


MENU

De-selecting this option causes the menu line to disappear from the top of the display.  You can cause the menu to re-appear by positioning the mouse cursor on the clock and double clicking the right mouse key.


ABOUT...

By selecting this option you cause a display to appear which describes the authorship and copyright ownership of  MYCLOCK.