  DWDoor Version 2.2
  Written by James R. Davis
  (C) Copyright 1993 - All Rights Reserved

  This program will require your name to play when in LOCAL mode.
  To call up this program, you need to have a .CFG file present in
  in the current directory.

  Modify the supplied DWDOOR.CFG to your needs.  It is commented
  and contains information not supplied here.

  To invoke this program in local mode, simply type DWDOOR or
  DWDOOR LOCAL at the DOS prompt.  Or to get this help type
  DWDOOR ? at the DOS prompt.

  To set this program up as a door, modify the supplied DWDOOR.CFG
  and use the command DWDOOR DWDOOR.CFG at the DOS prompt.
  You can change the name of the .CFG file and include drive and
  pathname.




  If an error occurs during program execution a file named DWDOOR.ERR
  will be created in the current directory and specify the error with
  a brief description.  Type this file if an error occurs to see what
  you may have to change to fix it.  If the error cannot be fixed, let
  me know exactly what the file contains.

