;******* Maximus CBCS DownSORT Definition File (.DEF) ********
;
;  The module definition file supplies extra information about the program
;  module to the LINKER.

NAME    Downsort  WINDOWCOMPAT

DESCRIPTION 'MAXimus CBCS DOWNload file SORT. Copyright (1987,93) Rob Hamerling'
; PROTMODE
STACKSIZE  80000
HEAPSIZE   80000
; STUB      "d:\toolkt13\bin\os2stub.exe"
