 
           THE FOLLOWING KEYS HAVE SPECIAL FUNCTIONS WHILE LOGGING:
           --------------------------------------------------------

  <Alt-K>  Runs a CW KEYER.  As soon as the keyer screen is shown,
           you send CW via a serial (COM) port to your rig just by
           typing.  A CW KEYER HELP screen appears which shows how
           function keys are used to send or store CW memories.

  <Alt> +  Holding <Alt+F1> while on the logging screen sends CW from
    <F?>   MEMORY #1.  This works for <F1> through <F6> for all 6 CW
           memories.

  <Alt-T>  Starts a 10-MINUTE ID TIMER.  This timer can be used to
           remind you to identify your station.  Press the <Alt> key
           along with the <T> key to start, stop, or reset the timer.

  <Alt-L>  Can be used to print an address label, if you are using one
           of the compatible callsign database systems with Log-EQF.
           "LABEL PRINT" will appear when this option is available.

  <Esc>    is used to leave the logging screen and return to the
           MAIN MENU.  Note that <Esc> is used to leave any Log-EQF
           screen, and return to the MAIN MENU.

  <Ctrl>   displays a SCRATCHPAD screen, which can be used to "doodle"
           during a QSO.  You can also lookup a callsign while on the 
           SCRATCHPAD, if you have a callsign database installed.

  <F11>    keys may be used to run other programs from within Log-EQF.
    <F12>  Files SHELL11.BAT and SHELL12.BAT must be setup to run the
           programs desired.  Consult your DOS manual if you require
           assistance with setting up BATCH files.
 
  <Alt-E>  displays a popup menu for EXTERNAL CONTROL.  There are three
           ways to control the data lines on the computer's parallel (LPT)
           port.  <F1> is MANUAL - where 1-8 correspond to the eight data
           lines.  <F2> is AUTO - where the lines are selected according to
           the frequency ranges specified in file LOG-EQF.FRQ.  <F3> is both
           AUTO and MANUAL, following the "CT" program standard.


  Log-EQF is a SHAREWARE program. If you have not already registered
  with the author of Log-EQF, please do so before continuing to use
  this software.  Registration is easy and inexpensive - just $25 US!
  You can register using your credit card by calling: 1-800-995-1605.
  
  Registrations, questions, and comments about Log-EQF may be sent to:
  
             ┌─────────┐
       ┌─────┴───┐     │              (R)          EQF Software
     ──│         │o    │──────────────────
       │   ┌─────┴╨──┐ │  Association of           Tom Dandrea, N3EQF
       │   │         │─┘  Shareware                396 Sautter Drive
       └───│    o    │    Professionals            Coraopolis, PA 15108
     ──────│    ║    │────────────────────         USA
           └────╨────┘    MEMBER
  
  
  If you are a REGISTERED USER, thank you!         73 de N3EQF
