Copyright: Copyright ®1993 Meyer Software Design


Simple Saver Version 1.00 Help
Power Button
On/Off Toggle. Red indicator shows status
Bright red=ON, Dark red=OFF
Exit Button
Closes Panel Window
Timer Buttons
Sets timer count. < = decrease > = increase
Increment/Decrement in 15 second intervals from 15 sec
up to 86400 seconds(24 hrs).
Listbox
Listbox contains the module list. Click on the
module desired. The selected module is automatically saved.
The saved module becomes the default next time it is run.