NAME	     

DESCRIPTION  'Application'

EXETYPE      WINDOWS

STUB	     'WINSTUB.EXE'

;CODE can be moved in memory and discarded/reloaded

CODE  PRELOAD MOVEABLE DISCARDABLE

;DATA must be MULTIPLE if program can be invoked more than once

DATA  PRELOAD MOVEABLE MULTIPLE


HEAPSIZE     2048	   ; Must have for components
STACKSIZE    15000	   ; recommended minimum for Windows applications

