; Module name: Meter.DEF
; Programmer : Jeffrey M. Richter

LIBRARY     METER
DESCRIPTION 'Meter Custom Control Library'
EXETYPE     WINDOWS
STUB        'WinStub.Exe'

;The code segment is marked as PRELOAD FIXED NONDISCARDABLE because this 
;module is used by the Setup Application presented in Chapter 8.
;In a DLL, Windows allows code segments to be discarded if FIXED is
;not specified.  This is why FIXED appears below.
CODE        PRELOAD FIXED NONDISCARDABLE
DATA        MOVEABLE PRELOAD SINGLE
HEAPSIZE    1024
EXPORTS  
   WEP            @1    RESIDENTNAME
   MeterInfo      @2
   MeterStyle     @3
   MeterFlags     @4
   MeterWndFn     @5
   MeterDlgFn     @6
