8.5   Setup
      =====

      This little utility lets you take a look at your CMS software setup
      configuration, and allows you to change it.

      To access setup:

      A. Press <S> at the "Utilities" menu and then press <Enter>.

         A "Setup" window will appear:

         ================ Setup ================
         |  Color Monitor: Y                   |
         |     Label Size: 5                   |
         |     Merge Type: WS                  |
         | Federal Tax ID: 93-1234 567         |
         =======================================

      B. Check, or modify the information:

         Color Monitor:  Press <Y> if you have a color monitor and video card.
                         Press <N> if you have a monochrome monitor and video
                         card.
                         This will affect your display in CMS.

         Label Size...:  Type in the number of lines per label. Default: 5
                         This affects your label printing in CMS.

         Merge Type...:  Type in the merge type. Default: WS (Wordstar).

                         Options: WP (Wordperfect)
                                  LE (Leading Edge)
                                  WS (Wordstar Classic)
                                  W2 (Wordstar 2000)

                         This will affect your merge record generation in CMS.

         Federal Tax Id: Type on your Church's Federal Tax ID code here.
                         This information currently is not used in CMS, but
                         may be used in future updates to this software.


      C. Press <PgDn> when done, and all the changed information will be saved.

         If you press <Esc> instead the previous information will be restored,
         and you will be returned to the "Utilities" menu.

