8.8   Password
      ========

      This little utility lets you change the password providing access to the
      "Stewardship" menu. The default password is "PASSWORD".

      To change the current password:

      A. Select "Password" at the "Utilities" menu and then press <Enter>.

         The "Password" window will appear:

      B. Type in the current password (default: PASSWORD).

         If you typed an incorrect password you will be returned to the
         "Utilities" menu.

         If you typed in the correct password you will be prompted to type in
         the new password.

      C. Type in the new password and press <Enter>.

         You will be prompted to re-type the new password. This is a security
         precaution.

      D. Re-type the new password and press <Enter>.

         If you typed the new password differently the second time, then the
         old password will be restored.

         Only if you typed the new password both times the same way, will the
         new password be installed, and the old password setting will be lost.

      E. You will be returned to the "Utilities" menu.

