9.  QUIT TO THE DOS OPERATING SYSTEM
    ================================

    Here you exit the CMS system and return to DOS.

    To exit CMS:

    A. Press <Esc> until you are at the "Main" menu.

    B. Press <Q> to select "Quit to DOS", and then <Enter>.

    C. All CMS files will be safely closed and you are returned to DOS.

