

       =============================================================
       If you are unable to run KNIGHTMARES, use the /g switch.  For
       example, type KMS42 /g.  This will force  the  publication to
       give  you its mode choices.  After 256 colour mode, choose 16
       colour mode.  If 16  doesn't work, experiment.  Always choose
       640 x 480 for screen size.  If you still have trouble, please
       write to us...

                              MDG PUBLICATIONS
                                21 Harrison
                             Catskill, New York
                                 12414-1506

                      marcus.d.gregio@secretgarden.com

       Please be sure to include all information about your computer
       and what is or isn't happening.  Thanks.
       =============================================================
