StopLite v1.1

©1995 anno Domini, inc.

Green Light

Free System Resources are equal to, or greater than, 60%.

This is ideally where you would want your Free System Resources to be.

Yellow Light

Free System Resources are between 30 and 60%.

This is a caution area.

Red Light

Free System Resources are less than, 30%.

This is definitely where you don't want your Free System Resources to be.  You need to close an application or two so that you do not crash your system.

This is Shareware!  Please register!  Registration is only $5.00 plus $2.00 (for Network/Messaging/Shipping Fees).  Send check or money order to:

anno Domini, inc.
616 Crescent Drive
Reidsville, NC  27320

...Or, for $10.00 plus $2.00 (for Network/Messaging Fees) you can receive the Visual Basic SOURCE CODE.

Registrations for the SOURCE CODE can be obtained via the SWREG forum on CompuServe by searching by AUTHOR ID 76531,2651.  This is the QUICKEST AND EASIEST way to register.  Or, you can choose to call 1-800-254-8882 and register with your Mastercard or Visa.

To contact us via e-mail:
America Online:  Keystone95
CompuServe:  76531,2651
Internet:  Keystone95@aol.com