Product Catalog

Thank you for looking at our catalog.  As you scroll down this screen you will see the various products.  All have shareware versions you can try for free available from our BBS in Virginia at 1- 804-249-8909.

Screen shots are smaller and not as clear as the actual products.  This is to done to keep the file size small.  Pictures and underlined text can be mouse clicked for additional information.

Do you need Computer Networking or Custom Software call Cyan Systems.

Order your copy today note all the products may be ordered online

Compuserve GO SWREG and use the search feature to locate the product.

Clicking below will show a Registration form

Registration FormTravel Valet is a complete travelers information kit for Windows. Designed to put the most needed travel information at your finger tips.

Click on an airplane to call up a complete list of airline 800 numbers. Large colorful easy-to-read text makes it fun to use even from a small notebook computer.

Travel Valet contains special reports on Las Vegas and Orlando Florida and special added bonuses including a US Government guide, which gives you finger tip access to all the government bulletin boards and information.

Features:

1.	Complete list of Airline 800 numbers. Ontime and lost luggage statistics.

2.	List of low cost discount airlines, and where they fly.

3.	Rental car 800 numbers. Discounts.

4.	Hotel 800 numbers. And how to get the best rates.

5.	Emergency numbers. Like stolen credit cards and travelers checks.

6.	Discount guide, including how to fly cheaply or even free.

7.	Las Vegas guide. Complete show, hotel, gambling information. Where to

   	stay, where to eat, major attractions, how to get the best rates. Insider tips.

8.	Orlando guide. Where to stay, directions to major attractions, all the

  	the numbers and information you need to plan your trip.

9.	International travel guide. Passport information, shopping tips,

   	packing tips, driving, Eurailpass, statistics on crime and health hazards.

10.	Compuserve and America Online access and technical support numbers.

11.	Internet information and a FREE ID application.

12.	Dept of State International Country Information.

13.	Windows Custom Calendar and Disk Graph program.

14.	Air Passenger Rights. How to handle problems, lost luggage.

Bonus Special US Government guide provides answers to questions such as:

1.	How to get low cost home and business loans?

2.	How to buy cars, boats, real estate for bargain prices?

3.	How to start your own business?

4.	What money, tools, and information the government has that you can use?

5.	How to access up to the minute economic, travel, and other statistics?

Order your copy today by sending $23 cash or check  to

James Tolliver

P.O. Box 4071

Stamford, CT 06907

 Phone 1-203-322-0298

 Compuserve  74213,163 and 76516,1246

 AOL             JTJTJTJT

 Internet        JTJTJTJT@AOL.COM

Registration Form


Turbo Picture Poker
Turbo Picture Poker for Windows

Fastest, most exciting poker game ever.

Major league features include

⇒	Winning percentage Color Pie Graph

⇒	Plays any sound WAV files you have

⇒	Displays any pictures BMP files

⇒	Full statistics in a Scrollable window

⇒	High quality fast graphics.

⇒	System Information disk/cpu/memory

⇒	Large *Bonus* payouts on any high hands.

⇒	Popup Help on all controls. 16 bit Sound.

⇒	Customize all of the colors

⇒	Popup graphics and 16 Bit Sound on winning hands.

⇒	Time and Date display.

Only $19 for programmer direct discount price

Registration Form

Special price with Turbo Caribbean Stud Poker both games for $25


CD Minibar

Now you can control your CD player while running any other

applications in Windows. CD MiniBar plays audio Compact discs plus

features fours separate system graphs, and many great utilities.

Even if you already own a CD utility, only the minibar allows you

to program a disc from scratch in under 2 seconds.

Full featured utility package in a tiny space.

Top rated CD Player,  with Set Time,  Calendar,

System Graphs, CD info utility,

path and directory utility.

Resizable controls let you select from three

tiny tool bars, change with a click.

Smart, well designed tools which can remain

on the screen without interfering with what you

are running.

Easy to use. Install and go.

Fully customizable.

Only $20 for programmer direct discount price.

Registration Form


MRNFL
Mr.NFL v3.1 Pro Football Analyzer for Windows

Most Powerful NFL Handicapper around.

∗	Predicts games against spread.

∗	Make your own formulas, or use ours.

∗	Free stats downloading from our BBS.

∗	View stats any way you want.

∗	Includes a powerful formula tester.

∗	Takes into account Weather, Injuries, and more!

∗	Our BBS provides you with lastest information.

∗	Discuss selections on our BBS with other football fans.

∗

Shareware $40 by Richard Tolliver

Registration Form


Turbo Caribbean Stud
Turbo Caribbean Stud Poker

Fastest, most exciting poker game ever.

Major league features include

⇒	Full statistics for both dealer and Player

⇒	Win percentage Color Graphs for Player and Dealer

⇒	Surrender Percentage graph

⇒	Highest quality fastest graphics of any poker game.

⇒	Large *Bonus* payouts on any high hands two pair or more.

⇒	Popup Help on all controls. Learn to use while you play.

⇒	Plays like the casino game

⇒	16 Bit Sound

⇒	Popup graphics on winning hands.

Shareware $15 <ASP>

Special price with Turbo Picture Poker both games for $25

Registration Form


Home Business Guide
Home Business Guide is a Windows guide to starting a business from home.

* Covers selecting, planning, financing, and launching your business.

* Resources, tools, and help available.

* Turning your free time into extra cash.

* Details how to create help file products like this one using any Word Processor.

* Learn to produce and market multimedia products without programming.

* No get rich quick promises. The guide simply gives you a startup outline,

* and the tools you need to produce Windows ready words and pictures.

Only $29 direct discount price.

Registration Form


Cyan Systems
This catalog is a product of Cyan Systems.  If you want to reach your potential customers and get the most from your advertising budget call us at 1-203-230-2168.

Cyan Systems is a leader in networking, PC hardware, and custom software solutions.  We are employee owned and experts in Computer solutions.  Call us first for all your computer needs and equipment purchases.

•	Networking solutions. Our staff includes certified Novell and Banyan Lan experts.  We can help you connect all your computers and share resources like printers and cdroms.

•	Software Solutions.  We can help you select the best software solution for your needs.  Our staff of experts can provide you with a custom software product using the latest in Rapid Application Development tools.

•	Computer Purchasing/Repairs  We provide and repair new and used equipment.  Call us for low cost leasing, disk and memory upgrades, PC repairs.

•	Help Desk outsourcing.  We provide help desk services for many companies.  Our well trained staff can provide expert solutions for your companies computer users.

•	Product Catalogs like this one including pictures and description of all your products, information and phone numbers

•	Company Telephone Directorys for Windows, with pictures and keyword search.

•	Multimedia  Resumes,  Business Cards,  and Annual Reports which get noticed.


order form
Order form. Use the print topic in the menu to print this form.

Thank You.   Contact Information:Contacting the Author

You can copy this to your Clipboard and Paste/Edit/Print  with Notepad

James Tolliver <ASP>	Your Name:	______________________

P.O. BOX 4071

Stamford CT 06907-0071	Company:	______________________

USA

                             	Date:	______________________

              Payment Options.         All orders shipped very quickly.

 1. Cash. Use form below. International see details below.

 2. Checks and Money Orders. International Please see details below

Address: _____________________________________________________

 City:     ______________________________________________________

 State or Province:  __________	Country: __________________

 Zip or Postal Code:   ___________	Telephone: __________________

Qty             Unit Price      Total

___     TRAVEL VALET       	$19.00 ___________

__       CD MiniBar        	$20.00 ___________

 Best Tiny Audio CD Player.

__       Turbo Caribbean Stud Poker	$15.00 ___________

__       Turbo Picture Poker         	$19.00 ___________

___     Two Poker Games (save $9) 	$25.00 ___________

Special offer.

__       Home Business Guide	$29.00 ___________

 Learn to start your own Business.

__       Mr. NFL Pro Football Analyzer	$40.00 ___________

Shipping $4 US and Canada $6 International 	___________

            includes 3 1/2 disk.

     (International users may use

      cash, US check or money order of	Total  ___________

      equivalent funds)

     Comments ___________________________________________________

     ____________________________________________________________

Form ctlg1

Your Online ID Internet, CIS, AOL  ______________________________


Contacting the author
Thank You for trying this program.

We realize people are often nervous ordering products through the mail.  If you have any questions or doubts please feel free to contact us,  we want you to be happy with us as well as the products,  we plan to be around for a long time and will send your order out right away.

Being small we try and ship the day the order is received.

Contacting the Author:

Compuserve: 74213,163

America Online: JTJTJTJT

Internet: JTJTJTJT@AOL.COM

Support BBS 1-804-249-8909

James Tolliver <ASP>

P.O. BOX 4071

Stamford CT 06907-0071

USA

Telephone  1 203 322 0298

Author is an active member of both STAR and the Association of Shareware Professionals, and holds a B.S degree in Computer Science.  Also the author of several retail software packages published under various company names.