Copyright: Copyright ® ...1995


About LED clock

When the progran is running, you will notice there is no visible menu.  The configuration functions are accessed via a popup menu.  Just right-click your mouse while the mouse pointer is over the clock.  You will then see the menu (figure at left).

•  Position: Select Top or Bottom.  The program will center the clock on the top or bottom of your screen.  You can also drag the titlebar if you need to move the clock.
NOTE: When the clock is exited the position (top or bottom) is saved.

•  Color: You can select the color of the LED numbers.

•  Help: The help file can be activated by hitting "F1" when the clock is the active window.