#this file is include by the makefiles of the samples
#and the dll. It defines often used settings for the
#compiler and linker. See the makefiles for usage.

#compiler is EMX
COMPILE = gcc -Zmtd -Zomf -Zcrtdll -c
DEBUG   = -g
LINK    = gcc -Zmtd -Zomf -Zcrtdll
OPT     = -O2
MAKEDLL = -Zdll
