                                  Screen #0

If screen is hardly readable (monochrome / liquid cristal monitor), quit the
programm and type RS 7 7 7 7 0, with a blank space between characters.
Doing so, display appears black and white.

RADIOSIM uses five colors A B C D E in addition to white (7) and black (0).
Default colors are:

- A = 14 (Yellow)  for frames,
- B = 2  (Green)   for indicative informations,
- C = 3  (Cyan)    for page titles,
- D = 12 (Red)     for important informations,
- E = 1  (Blue)    for background.

To modify these colors, choose other values of A B C D E (see User's guide)
and run RADIOSIM typing RS A B C D E (separate characters by a space).
At further sessions, type only RS, informations A B C D E being saved on disk.

If screen is monochrome but allows intense white..... (15) and grey (8),

you may type, for example, RS 7 8 15 7 0, or RS 15 8 15 15 0, etc.

A sixth number, between  0 and 10, not necessarily integer, controls the
length, and consequently the discretion of acoustic warnings.
Default value is 3. A null value lead to inaudible warnings.

Example: with RS 14 2 3 12 1 .5  acoustic warnings are just perceptible.

