+-----------------------------------------------------------------------------+
|         ATEC-Error-List ú Copyright 1993,94 by Christian Ahrweiler          |
|-----------------------------------------------------------------------------|
| ATTENTION: Never change the form or style of that .HLP file !               |
+-----------------------------------------------------------------------------+
-6 = No EMS memory
-5 = No EMS driver
-4 = IO error
-3 = No memory
-2 = .OVR Not found
-1 = General error
 1 = Invalid function number
 2 = File not found
 3 = Path not found
 4 = Too many open files
 5 = Access denied
 6 = Invalid file handle
 7 = Memory control-blocks destroyed
 8 = Not enough memory
 9 = Invalid memory address
10 = Invalid environment
11 = Invalid format
12 = Invalid access code
13 = Invalid Data
14 = Undocumented error
15 = Invalid drive number
16 = Cannot remove current directory
17 = Cannot rename across drives
18 = No more files
19 = Write protect error
20 = Undocumented error
21 = Not ready
22 = Undocumented error
23 = Data error
24 = Invalid device request parameters
25 = Seek error
26 = Invalid media type
27 = Sector not found
28 = Printer out of paper
29 = Write fault error
30 = Read fault error
31 = General failure
32 = Sharing violation
33 = Lock violation
34 = Invalid disk change
35 = FCB unavailable
36 = System resource exhausted
37 = Code page mismatch
38 = Out of input
39 = Insufficient disk space
100 = Disk read error (Attempt to read beyond EOF)
101 = Disk write error (disk full)
102 = File not assigned
103 = File not open
104 = File not open for input
105 = File not open for output
106 = Invalid numeric format
150 = Disk is write-protected
151 = Unknown unit
152 = Drive not ready
153 = Unknown command
154 = CRC error in data
155 = Bad drive request structure length
156 = Disk seek error
157 = Unknown media type
158 = Sector Not Found
159 = Printer out of paper
160 = Device write fault
161 = Device read fault
162 = Hardware failure
200 = Division by zero
201 = Range check error
202 = Stack overflow error
203 = Heap overflow error
204 = Invalid pointer operation
205 = Floating point overflow
206 = Floating point underflow
207 = Invalid floating point operation
208 = Overlay manager not installed
209 = Overlay file read error
210 = Object not initialized
211 = Call to abstract method
212 = Stream registration error
213 = Collection index out of range
214 = Collection overflow error
215 = Arithmetic overflow error
216 = General Protection fault
301 = String to short
302 = Converting to numeric
303 = Out of range
304 = Illegal operation
305 = Division by zero
306 = Converting string
401 = No swap storage in XMS/EMS
402 = File not found
403 = Path not found
404 = Undocumented error
405 = Undocumented error
406 = Undocumented error
407 = Undocumented error
408 = Insufficient memory
410 = TEMP directory (SET TEMP) does not exist
411 = No swap storage on disk
501 = Not a plain text file
502 = Unsupported video system detected
2900 = Can't open port, no slots available
2901 = UART receiver overrun
2902 = UART receiver parity error
2903 = UART receiver framing error
2920 = Block shorter than requested
2921 = No room for new char in buffer
2922 = No characters to get
2923 = Timed out waiting for something
2924 = String shorter than requested
2925 = String longer than 255
2926 = User aborted during "wait"
2930 = No room in table to add new entry
2931 = Modem - no command registered
2940 = Failed to open or write to the event file
2941 = Failed to open or write to the trace file
2950 = No fossil installed
2960 = Generic Digiboard failure code
8900 = Out-of-range port number
8901 = General out-of-range error
8902 = Port not open
8903 = Bad baud rate for this device
8904 = General programming error
8905 = No device layer installed
8906 = Couldn't find a uart at this address
8907 = Bad parity option for this device
8910 = Operation only allowed on buffered ports
8911 = Function not supported by device-layer
9800 = Call is VOICE
9801 = Call is DATA
9802 = called modem is busy
9803 = could not find font file
9804 = CASMGR TSR not installed
9805 = unexpected response in init
9806 = Failed to train with remote modem
9807 = Error during session
9808 = No connection after dial
9809 = Failed to send page after retries
9900 = Xmodem init failed
9901 = Xmodem init was canceled on request
9902 = Cancel requested
9903 = Duplicate block received
9904 = Wrong block number received
9905 = Directory not found in protocol transmit
9906 = No matching files in protocol transmit
9907 = Long packet received during protocol
9908 = End of transmitted file
9909 = Initial protocol handshake in progress
9910 = Incoming file was renamed
9911 = Incoming file already exists
9912 = Ymodem header has bad file size
9913 = Ymodem header has bad date/time
9914 = Unexpected char during protocol
9915 = Incorrect CRC or checksum received
9916 = No search mask specified for transmit
9917 = No filename specifed in xmodem download
9918 = Ascii receive in progress
9919 = Receiver rejected file
9920 = Too many errors received during protocol
9921 = No end of list marker found in file list
9925 = Zmodem - got CrcE DataSubpacket
9926 = Zmodem - got CrcW DataSubpacket
9927 = Zmodem - got CrcQ DataSubpacket
9928 = Zmodem - got CrcG DataSubpacket
9929 = Zmodem - got garbage from remote
9930 = Zmodem - skip file
9931 = Zmodem - bad file position
9932 = Zmodem - specified file doesn't exist
9933 = Zmodem - not allowed to overwrite file
9934 = Zmodem - never got proper handshake
9935 = Zmodem - no files to receive
9936 = ZModem - port buffers too small
9937 = Zmodem - got a complete header
9938 = Zmodem - (internal) no header yet
9940 = Unexpected char in modem result string
9941 = Modem response - CONNECT
9942 = Modem response - RING
9943 = Modem response - NO CARRIER
9944 = Modem response - NO DIALTONE
9945 = Modem response - BUSY
9947 = Modem response - NO ANSWER
9948 = Modem response - RINGING
9949 = Modem response - VOICE
9950 = Modem response - ERROR
9954 = Kermit - got packet
9955 = Kermit - no data yet
9960 = Unknown compression method
9961 = Cannot extract--file is encrypted
9962 = Bad CRC--file is probably corrupted
9963 = Unable to create output file
9964 = Bad archive file format
9965 = Not an LZH file
9966 = Not a ZIP file
9967 = File mask list is empty
9970 = Not a valid APRO fax file
9971 = Bad font format or unsupported feature
9972 = Converting font
9973 = Bad tiff/pcx format or unsupported feature
9974 = Bad escape sequence in PCL file
9980 = Scroll back buffer > 64k
9985 = Resyncing with host
9986 = Waiting for ACK
9987 = Dropout
9988 = Host cancel
9989 = Attempting resume
9990 = Host resuming
9991 = Resumed OK
9992 = Failed to resume
9993 = Invalid packet type
