                           ÿHELP MENUÿ

ÿp/Pÿ............. Print current page on LPT1.
ÿm/Mÿ............. Set bookmark at current page (up to 50 marks)
ÿKÿ............... Return to bookmark moving from old to young.
ÿkÿ............... Return to bookmark moving from young to old.
ÿu/Uÿ............. Unmark current page.
ÿAlt Uÿ........... Unmark all pages.
ÿsÿ............... Search/scan for string, case insensitive.
ÿSÿ............... Search/scan for string, case sensitive.
ÿr/Rÿ............. Repeat last search/scan.
ÿ/ÿ............... Invoke index tab style menu.
ÿ<enter>ÿ......... Backtrack after jump/scan (enter alone, no #)
ÿAlt Sÿ........... Shell to DOS: type 'exit' to return.
ÿf/Fÿ............. Change foreground color. Push repeatedly.
ÿb/Bÿ............. Change background color. Push repeatedly.
ÿh/Hÿ............. Display a list of available functions.
ÿ1-10,000ÿ........ Jump to page: type a page # and press <enter>.
ÿPgUp/PgDnÿ....... Flip forward or backward one page.
ÿHomeÿ............ Takes you to the beginning of Medical Pearls.
ÿEndÿ............. Takes you to the end of Medical Pearls.
ÿCtrl PgUp/PgDnÿ.. Moves forward or backward 10 pages.            
