Copyright: MC Software® 1995


Contents

Introduction

What is MCS Clock

Procedures

Options Menu

Reference

Index


What is MCS Clock

MCS Clock is a time/date visual display clock that is diplayed through Windows. It is designed to load when Windows is loaded by being placed in the Startup program group in Windows program manager. If you click on the date area of MCS Clock, the Options menu will be displayed and if you click on the time area of MCS Clock, this will load Windows file manager.

To register MCS Clock send $5.00 to...

MC Software
P.O. Box 562
Morrison, CO  80465-0562

Options Menu


Options Menu

This is the dialog box you will view if you click the date area of MCS Clock to load the Options menu. Make your selection of color, where you want MCS Clock to be displayed, and whether or not you want MCS Clock to stay on top of other applications. After making your selections click the Accept Options button to save your selections. If you choose not to save your options click the Exit Options button to leave without making any changes. If you desire to close the MCS Clock program click the Exit MCS Clock button and it will remove MCS Clock from memory.


Index

C

Contents

I

Index

O

Options Menu

W

What is MCS Clock