 Downloading files can be extremely easy.  Once you have located a file you
would like to download, simply press D for [D]ownload-file and type the name
of the file to be transferred.  If you have not set a default file transfer
protocol, Fortress will default to Xmodem.  The BBS will show you how many bytes
are involved in the file transfer, approximate the amount of time it will take
to complete the download, and ask for confirmation.  Press [Y] to start the
download.

%DOHELP                          --------------Go to Main Help Menu
%FILES                          -------------Go to Files Help Menu
