 (spout off a little about the value of messages...below is my quote)
 
 OverMind is not a file server; the message base has been allocated 4 megabytes
of storage on the hard drive.  This is the heart of OverMind.  Please help keep
it healthy.
 
%DOHELP                          --------------Go to Main Help Menu
 
%ENTER                          ------------How to enter a message
%HELD                          -------------How to hold a message
%READ                          --------------How to read messages
