 If someone has entered a message in a room since you were last in that room,
Fortress will consider it to be new to you, and you can use [G]oto to go to it
automagically, or .G(oto) ROOMNAME to go to it manually.
 
 If, for some reason, you enter a room and decide that you want the system to
think that you HAVEN'T been in that room, the [S]kip command is available to
accomplish this.
 
 The [S]kip command usage is identical to the [G]oto command usage.  To skip
the room that you are currently in and go to the next room with unread messages,
simply use the single key command, [S]kip.  Fortress will print out the name of
the room it is going to, and will remember that you've Skipped the room you are
leaving.  To skip the current room and go to a specific room, type:
 
 .S(kip) ROOMNAME
 
 If you get to the point where there are no more rooms with unread messages
besides the one(s) that you've skipped, the BBS will print out the list of
rooms that you've skipped and change those rooms' status from Skipped back
to simply rooms with unread messages.
 
 Terminating with rooms on the Skipped list simply leaves them marked as having
unread messages in them for the next time you login.
 
 Skip differs from Ungoto, in the direction if moves when leaving the current
room.  Ungoto moves you back to the previous room and makes those messages new
again, while Skip moves you forward to the next room with new messages in it.
 
%DOHELP                          --------------Go to Main Help Menu
%MOVEMENT                          ----------Go to Movement Help Menu
%ROOMS                          -------------Go to Rooms Help Menu
