 Terminal    Description
 --------    -----------------------
 Ascii       80 col, no graphics
             (this is the default)
 
 Ansi        80 col, colour graphics
 Expert      80 col, no graphics,
              terse menus/blurbs
 IBM         80 col, no graphics,
              (ibm character set)
 40col       40 col, no graphics
