 Sometimes you will read the messages in a particular room and, after reading
them, decide that you do not want the new messages to be marked as old.  In
this case, at the room prompt, simply press the "B" key to "backup" to the last
room.  You will be moved back to the last room you were in.  Fortress will NOT
update the message pointers in a room you have left by means of backup.
 
%DOHELP                          --------------Go to Main Help Menu
%ROOMS                          -------------Go to Rooms Help Menu
