 [U]pload has not yet been enabled since it involves removing the [U]ngoto
command many Citadel users are familiar with.  Currently, to upload a file, you
must use one of the more advanced commands detailed in the TRANSFER help file.
 
 (change the following if you have open file areas)
 
 Uploading files can be extremely easy.  All uploads to this system are screened
before posting.  Uploads are permitted only in the "Uploads" room.  To upload a
file, simply press U for [U]pload-file and type the name of the file to be
transferred.  If you have not set a default file transfer protocol, Fortress
will default to Xmodem.  The BBS will ask you to describe the file and ask for
confirmation.  Press [Y] to start the upload.

%DOHELP                          --------------Go to Main Help Menu
%FILES                          -------------Go to Files Help Menu
