Here's the line to add to your PROTO.DEF for using the new PUMA protocal.
Instead of the environment variable DSZLOG, I thought it best to set the
log file name as below. This method correctly recognizes XFER-1.DEF and
XFER-2.DEF on my 2-node system.
 
                                            Chip Morrow
 
"P)uma
",0,S,8,,B,1024,,0.95,,1=E,"PUMA.EXE Lxfer-[NODE].def S[BAUD] s [FILE]","PUMA.EXE Lxfer-[NODE].def S[BAUD] r [FILE]"
