PC Information Group, Inc.

This file explains what type of DOOR.SYS file that the Black Jack door game
wants. For information on using the Black Jack game, please refer to the
BJREADME.DOC file.

DOOR.SYS DEFINITION FILE
-----------------------------------------------------------------------------
 1) COM1:             <-- Comm Port - COM0: = LOCAL MODE
 2) 2400              <-- Caller's Baud Rate
 3) 8                 <-- Parity - 7 or 8
 4) 1                 <-- Node Number - 1 to 99                    (Default to 1)
 5) 19200             <-- DTE Rate. Actual BPS rate to use.
 6) Y                 <-- Screen Display - Y=On  N=Off             (Default to Y)
 7) Y                 <-- Printer Toggle - Y=On  N=Off             (Default to Y)
 8) Y                 <-- Page Bell      - Y=On  N=Off             (Default to Y)
 9) Y                 <-- Caller Alarm   - Y=On  N=Off             (Default to Y)
10) Jody Ronning      <-- User Full Name
11) Winona, MN        <-- Calling From
12) (214)555-5555     <-- Home Phone
13) (214)555-5555     <-- Work/Data Phone
14) PASSWORD          <-- Password
15) 110              *<-- Security Level
16) 1456              <-- Total Times On
17) 10/07/93          <-- Last Date Called
18) 7560              <-- Seconds Remaining THIS call (for those that particular)
19) 126               <-- Minutes Remaining THIS call
20) GR                <-- Graphics Mode - GR=Graph, NG=Non-Graph, 7E=7,E Caller
21) 24                <-- Page Length
22) Y                 <-- User Mode - Y = Expert, N = Novice
23) 1,2,3,4,5,6,7     <-- Conferences/Forums Registered In  (ABCDEFG)
24) 7                 <-- Conference Exited To DOOR From    (G)
25) 01/01/99          <-- User Expiration Date              (mm/dd/yy)
26) 1                 <-- User File's Record Number
27) Y                 <-- Default Protocol - X, C, Y, G, I, N, Etc.
28) 0                *<-- Total Uploads
29) 0                *<-- Total Downloads
30) 0                *<-- Daily Download "K" Total
31) 999999            <-- Daily Download Max. "K" Limit
32) 10/22/88          <-- Caller's Birthdate
33) G:\PCIG\MAIN      <-- Path to the MAIN directory (where User File is)
34) G:\PCIG\GEN       <-- Path to the GEN directory
35) Brian             <-- Sysop's Name (name BBS refers to Sysop as)

The rest of the lines are optional

36) Big Guy           <-- Alias name
37) 00:05             <-- Event time                        (hh:mm)
38) Y                 <-- If its an error correcting connection (Y/N)
39) N                 <-- ANSI supported & caller using NG mode (Y/N)
40) Y                 <-- Use Record Locking                    (Y/N)
41) 14                <-- BBS Default Color (Standard IBM color code, ie, 1-15)
42) 10               *<-- Time Credits In Minutes (positive/negative)
43) 07/07/90          <-- Last New Files Scan Date          (mm/dd/yy)
44) 14:32             <-- Time of This Call                 (hh:mm)
45) 07:30             <-- Time of Last Call                 (hh:mm)
46) 6                 <-- Maximum daily files available
47) 3                *<-- Files d/led so far today
48) 23456            *<-- Total "K" Bytes Uploaded
49) 76329            *<-- Total "K" Bytes Downloaded
50) This is a comment <-- User Comment
51) 10                <-- Total Doors Opened
52) 10283             <-- Total Messages Left

If your BBS doesn't create a compatible DOOR.SYS file like the one above,
please download the DOORMASTER program from our BBS. The BBS number is
(507) 454-8025.

The DOORMASTER will convert various file formats to other file formats.
