
The EIS BBS Software has both ANSI and non-ANSI menus, displays
and prompts.  If you have ANSI.SYS loaded on your computer,
type "C" to get color displays.  Read about ANSI.SYS in your
DOS manual.

You can turn ANSI on and off from the main menu with the "M"
command later on.

