
EIS-PC Help: G)oodbye, Logoff

G)oodbye should be used after you are done using the bbs.  Often important
information is display at the logoff taht you will need to know, so do
not just tell your terminal program to hangup on the bbs; type G and let the
bbs handle the technical aspects of dissconnection for you.

